INSERT INTO `emulator_settings`(`key`, `value`) VALUES ('pathfinder.execution_time.milli', '25');
INSERT INTO `emulator_settings`(`key`, `value`) VALUES ('pathfinder.max_execution_time.enabled', '1');

